-- noinspection SqlDialectInspectionForFile
-- noinspection SqlNoDataSourceInspectionForFile
SET statement_timeout = 0;
SET lock_timeout = 0;
SET client_encoding = 'UTF8';
SET standard_conforming_strings = on;
SET check_function_bodies = false;
SET client_min_messages = warning;
SET row_security = off;

CREATE DATABASE edgex WITH TEMPLATE = template0 ENCODING = 'UTF8';
ALTER DATABASE edgex OWNER TO postgres;
